%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Morey_etal2018} Morey, S., Wienders, N., Dukhovskoy, D., \& Bourassa, M. (2018). Measurement Characteristics of Near-Surface Currents from Ultra-Thin Drifters, Drogued Drifters, and HF Radar. \textit{Remote Sensing}, \textit{10}(10), 1633.

\end{thebibliography}

\end{document}

